-- 042: Red light status tracking on fcc_rmd records
-- Populated by the CORES Playwright scraper using PW's CORES login.

ALTER TABLE fcc_rmd
    ADD COLUMN IF NOT EXISTS red_light_status TEXT,         -- 'green', 'red', 'unknown'
    ADD COLUMN IF NOT EXISTS red_light_checked_at TIMESTAMPTZ;
